! xmlio_server namelist
!
! using_server: .TRUE.(.FALSE.) to use(bypass) the io_server
! using_oasis : .TRUE.(.FALSE.) if nemo is coupled through OASIS
! client_id   : used only for OASIS, NEMO      id in the namecouple 
! server_id   : used only for OASIS, io_server id in the namecouple
!
&coupling_param
  using_server = .FALSE.
  using_oasis  = .FALSE.
  client_id    = 'nemo.x'
  server_id    = 'ionemo'
/

! global_mpi_buffer_size: size in Mo of the MPI buffer used by the io_server
&mpi_param
  global_mpi_buffer_size = 512
/  

!!======================================================================
!!   namnc4            netcdf4 chunking and compression settings
!!======================================================================
!-----------------------------------------------------------------------
&namnc4         !  netcdf4 chunking and compression settings
                !  (benign if "key_netcdf4" is not used)
!-----------------------------------------------------------------------
   nn_nchunks_i   =   4       !  number of chunks in i-dimension
   nn_nchunks_j   =   4       !  number of chunks in j-dimension
   nn_nchunks_k   =   31      !  number of chunks in k-dimension
                              !  setting nn_nchunks_k = jpk will give a chunk size of 1 in the vertical which
                              !  is optimal for postprocessing which works exclusively with horizontal slabs
   ln_nc4zip      =   .TRUE.  !  (T) use netcdf4 chunking and compression
                              !  (F) ignore chunking information and produce netcdf3-compatible files  
/
  
