! xmlio_server namelist
!
! using_server: .TRUE.(.FALSE.) to use(bypass) the io_server
! using_oasis : .TRUE.(.FALSE.) if nemo is coupled through OASIS
! client_id   : used only for OASIS, NEMO      id in the namecouple 
! server_id   : used only for OASIS, io_server id in the namecouple
!
&coupling_param
  using_server = .FALSE.
  using_oasis  = .FALSE.
  client_id    = 'nemo.x'
  server_id    = 'ionemo'
/

! global_mpi_buffer_size: size in Mo of the MPI buffer used by the io_server
&mpi_param
  global_mpi_buffer_size = 512
/  
